XASSIGN will reassign one thing to something else

    -  xassign wsovly.ovr=c:\ws\wsovl1.ovr

        will re-direct all requests to dos for file wsovly.ovr
        to the sub-directory on the right of the equal sign.

        (DPATH is better for this purpose)


    -  xassign prn=c:\doc\output.doc

        will redirect printer output to a DOS file.

        (usefull in network applications)
